// Copyright 2016 Google LLC. All Rights Reserved.
//
// Licensed under the Apache License, Version 2.0 (the "License");
// you may not use this file except in compliance with the License.
// You may obtain a copy of the License at
//
//     http://www.apache.org/licenses/LICENSE-2.0
//
// Unless required by applicable law or agreed to in writing, software
// distributed under the License is distributed on an "AS IS" BASIS,
// WITHOUT WARRANTIES OR CONDITIONS OF ANY KIND, either express or implied.
// See the License for the specific language governing permissions and
// limitations under the License.

package testonly

// KEYS IN THIS FILE ARE ONLY FOR TESTING. They must not be used by production code.

// CTLogKeyPassword is the password for the test key
const CTLogKeyPassword string = "napkin"

// CTLogPrivateKeyPEM is an ECDSA private key for log tests
const CTLogPrivateKeyPEM string = `
-----BEGIN EC PRIVATE KEY-----
Proc-Type: 4,ENCRYPTED
DEK-Info: DES-CBC,CD876BDE00043553

mvY+JQH/K5NeNba10dtLyvkmVrH+hS9kPkKSk/exHPezCyHF8FytpOMC5sKDj5S4
180O3hcZytZMh3b7lvyimxZ5HmfTm+ZBxAEZCigmb+pBxSzTX7+MK7bew2XZeQdl
p4G1u2PHCzVeyPnRd2XLQ0SBo0T7pKsGVLgae4N45UA=
-----END EC PRIVATE KEY-----
`

// CTLogPublicKeyPEM is the corresponding public key
const CTLogPublicKeyPEM string = `
-----BEGIN PUBLIC KEY-----
MFkwEwYHKoZIzj0CAQYIKoZIzj0DAQcDQgAEQczNovWyMB74+fAgPAiX60k0M4cO
QYn3hIzwSTVAcrKhHDyT85t4BoXdgl6XzMAVHmF7b6GyKoyyya1hSW4lLg==
-----END PUBLIC KEY-----`

// CTLogIDBase64 is the log ID that corresponds to the test keys
const CTLogIDBase64 string = "fMW69rPsQG6J9V1zJeIvei6q+GGYrNxe84y5e0/KaEw="
